Let Y_1, . . . , Y_n be independent and identically distributed random variables with finite μ = E(Y ) and σ^2 = V (Y ). Let U_n =^{Y −μ}_{σ/}√_n . Then as n → ∞, U_n converges to a standard normal random variable in distribution.